\documentclass[10pt]{article}

\usepackage{fullpage}
\usepackage{setspace}
\usepackage{parskip}
\usepackage{titlesec}
\usepackage[section]{placeins}
\usepackage{xcolor}
\usepackage{breakcites}
\usepackage{lineno}
\usepackage{hyphenat}





\PassOptionsToPackage{hyphens}{url}
\usepackage[colorlinks = true,
            linkcolor = blue,
            urlcolor  = blue,
            citecolor = blue,
            anchorcolor = blue]{hyperref}
\usepackage{etoolbox}
\makeatletter
\patchcmd\@combinedblfloats{\box\@outputbox}{\unvbox\@outputbox}{}{%
  \errmessage{\noexpand\@combinedblfloats could not be patched}%
}%
\makeatother


\usepackage{natbib}




\renewenvironment{abstract}
  {{\bfseries\noindent{\abstractname}\par\nobreak}\footnotesize}
  {\bigskip}

\titlespacing{\section}{0pt}{*3}{*1}
\titlespacing{\subsection}{0pt}{*2}{*0.5}
\titlespacing{\subsubsection}{0pt}{*1.5}{0pt}


\usepackage{authblk}


\usepackage{graphicx}
\usepackage[space]{grffile}
\usepackage{latexsym}
\usepackage{textcomp}
\usepackage{longtable}
\usepackage{tabulary}
\usepackage{booktabs,array,multirow}
\usepackage{amsfonts,amsmath,amssymb}
\providecommand\citet{\cite}
\providecommand\citep{\cite}
\providecommand\citealt{\cite}
% You can conditionalize code for latexml or normal latex using this.
\newif\iflatexml\latexmlfalse
\providecommand{\tightlist}{\setlength{\itemsep}{0pt}\setlength{\parskip}{0pt}}%

\AtBeginDocument{\DeclareGraphicsExtensions{.pdf,.PDF,.eps,.EPS,.png,.PNG,.tif,.TIF,.jpg,.JPG,.jpeg,.JPEG}}

\usepackage[utf8]{inputenc}
\usepackage[english]{babel}



\usepackage{float}








\begin{document}

\title{asdsdasfddfadsfadfadf~ ~ ~ ~~}



\author[1]{Mahima Khatri}%
\affil[1]{Affiliation not available}%


\vspace{-1em}



  
  \date{May 21, 2024}


\begingroup
\let\center\flushleft
\let\endcenter\endflushleft
\maketitle
\endgroup





\selectlanguage{english}
\begin{abstract}
\url{https://onlinelibrary.wiley.com/doi/epdf/10.1002/ana.23951?src=getftr\#:~:text=We\%20recorded\%208,74\%2C\%20No.\%203}
We recorded 8 patients
(Table~\href{https://onlinelibrary.wiley.com/doi/full/10.1002/ana.23951\#ana23951-tbl-0001}{1})
with advanced idiopathic PD with motor fluctuations and/or dyskinesias
who gave their informed consent to take part in the study, which was
approved by the National Research Ethics Service Committee South
Central--Oxford A. Patients underwent DBS surgery on the STN as
previously
described.\href{https://onlinelibrary.wiley.com/doi/full/10.1002/ana.23951\#ana23951-bib-0010}{10}~In
Cases 2, 7, and 8 (see
Table~\href{https://onlinelibrary.wiley.com/doi/full/10.1002/ana.23951\#ana23951-tbl-0001}{1}),
the locations of the electrodes were confirmed with immediate
postoperative fast spin-echo T2-weighted magnetic resonance imaging
(MRI) with a Leksell frame still in situ. In the remaining cases,
locations were confirmed with immediate postoperative computed
tomography (CT) with a Leksell or CRW frame (Integra Radionics,
Burlington, MA) still in situ. CT scans were then fused with
preoperative T2-weighted
MRI.\href{https://onlinelibrary.wiley.com/doi/full/10.1002/ana.23951\#ana23951-bib-0011}{11}~Electrode
extension cables were externalized through the scalp to enable
recordings prior to connection to a subcutaneous DBS pacemaker,
implanted in a second operative procedure up to 7 days later. The
permanent quadripolar macroelectrode used was model 3389 (Medtronic
Neurologic Division, Minneapolis, MN), featuring 4 platinum--iridium
cylindrical surfaces. Its contacts are numbered 0, 1, 2, and 3, with 0
being the most caudal and contact 3 being the most cranial%
\end{abstract}%



\sloppy


al--Oxford A. Patients underwent DBS surgery on the STN aspreviously
described.10In Cases 2, 7, and 8 (see Table 1), thelocations of the
electrodes were confirmed with immediate post-operative fast spin-echo
T2-weighted magnetic resonance imag-ing (MRI) with a Leksell frame still
in situ. In the remainingcases, locations were confirmed with immediate
postoperativecomputed tomography (CT) with a Leksell or CRW
frame(Integra Radionics, Burlington, MA) still in situ. CT scans
werethen fused with preoperative T2-weighted MRI.11Electrodeextension
cables were externalized through the scalp to enablerecordings prior to
connection to a subcutaneous DBS pace-maker, implanted in a second
operative procedure up to 7 dayslater. The permanent quadripolar
macroelectrode used wasmodel 3389 (Medtronic Neurologic Division,
Minneapolis,MN), featuring 4 platinum--iridium cylindrical surfaces.
Itscontacts are numbered 0, 1, 2, and 3, with 0 being the mostcaudal and
contact 3 being the most cranial.We recorded bipolar LFP activity from
contacts 0--2 and1--3 of the electrodes in the STN after overnight
withdrawalof antiparkinsonian medication between operations for
elec-trode placement and pacemaker implantation. LFPs wereband-pass~
filtered~ between~ 3~ and~ 37Hz~ and~ amplified(39,100) using a 3-stage
common mode rejection amplifier.The system

\par\null

\textbf{}

\par\null\par\null\par\null\par\null

\selectlanguage{english}
\FloatBarrier
\end{document}

